Exhibition booth dome in NEC, Birmingham, 2018

Stand out your booth from the ordinary exhibition stands and tent halls! This time our company Polidomes was assisting the Moda Group company in creating the booth for Mlily products. The Mlily exhibition with the geo dome had to be exposed in Birmingham National Exhibition Center. NEC – is the busiest and seventh-largest exhibition centre [...]
Read More... from Exhibition booth dome in NEC, Birmingham, 2018